en	RSS feed block

en	Adds a block displaying a RSS feed.

en	RSS feed

en	Invalid feed URL

en	Invalid title

en	Invalid number of feeds

en	You have selected a feed URL from your own website. Please choose another URL.

en	Feed is unreachable, check your URL

en	Invalid feed: %message%

en	Error: invalid RSS feed in "%module_name%" module: %message%

en	Block title

en	Create a title for the block (default: 'RSS feed').

en	Add a feed URL

en	Add the URL of the feed you want to use (sample: http://news.google.com/?output=rss).

en	Number of threads displayed

en	Number of threads displayed in the block (default value: 5).